
SET SQL_MODE="NO_AUTO_VALUE_ON_ZERO";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8 */;

DROP TABLE IF EXISTS `lp`;
CREATE TABLE IF NOT EXISTS `lp` (
  `id` int(11) NOT NULL auto_increment,
  `steamid` varchar(150) NOT NULL,
  `points` int(11) NOT NULL,
  `rs` tinyint(1) NOT NULL,
  `rsmin` int(11) NOT NULL,
  `serverid` int(11) NOT NULL default '0',
  PRIMARY KEY  (`id`)
) ENGINE=MyISAM  DEFAULT CHARSET=ascii AUTO_INCREMENT=0 ;